{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"COMPANY","type":"character","width":32},{"name":"DBFSPATH","type":"character","width":52},{"name":"ELANPATH","type":"character","width":60},{"name":"REPOPATH","type":"character","width":52},{"name":"BACKUPSIZE","type":"character","width":48}],"n_rows":1,"rows_kept":1,"cut":false,"deleted_skipped":0,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"dbase_level_three","encoding_class":"enc_absent","reader":"statdb_count/12"}
[null,null,null,"¢¼k_cCEGms \u0099¢¼]_acegik \u0099¢¼_?ACikgq \u0099","¢¼=?ACEGIK \u0099¢¼=?ACEGIK \u0099¢¼=?ACEGIK \u0099¢¼=?ACEGIK \u0099"]